[#BloombergLP-bsls-operator_min]
= xref:BloombergLP.adoc[BloombergLP]::xref:BloombergLP/bsls.adoc[bsls]::operator&quot;&quot;&lowbar;min
:relfileprefix: ../../
:mrdocs:

Convert the specified `minutes` literal to a `TimeInterval`&period;

== Synopsis

Declared in `&lt;bsls&lowbar;timeinterval&period;h&gt;`

[source,cpp,subs="verbatim,replacements,macros,-callouts"]
----
constexpr
xref:BloombergLP/bsls/TimeInterval.adoc[bsls::TimeInterval]
operator&quot;&quot;&lowbar;min(unsigned long long minutes);
----

== Description

This user defined literal operator converts the specified `minutes` value to the respective `TimeInterval` value&period; The behavior is undefined unless the specified number of minutes can be converted to valid `TimeInterval` object&period; (See the &quot;User&hyphen;Defined Literals&quot; section in the component&hyphen;level documentation&period;)

== Return Value

a `TimeInterval` representing the specified number of minutes

== Parameters

[cols="1,4"]
|===
| Name| Description
| *minutes*
| minutes literal
|===


[.small]#Created with https://www.mrdocs.com[MrDocs]#
