[#BloombergLP-bsls-TimeInterval-totalMilliseconds]
= xref:BloombergLP.adoc[BloombergLP]::xref:BloombergLP/bsls.adoc[bsls]::xref:BloombergLP/bsls/TimeInterval.adoc[TimeInterval]::totalMilliseconds
:relfileprefix: ../../../
:mrdocs:

Return this interval as whole milliseconds, rounded toward zero&period;

== Synopsis

Declared in `&lt;bsls&lowbar;timeinterval&period;h&gt;`

[source,cpp,subs="verbatim,replacements,macros,-callouts"]
----
constexpr
xref:BloombergLP/bsls/Types/Int64.adoc[bsls::Types::Int64]
totalMilliseconds() const;
----

== Description

Return the value of this time interval as an integral number of milliseconds, rounded towards zero&period; The behavior is undefined unless the number of milliseconds can be represented with a 64&hyphen;bit signed integer&period; Note that the return value may be negative&period;

== Return Value

this interval as an integral number of milliseconds, rounded towards zero


[.small]#Created with https://www.mrdocs.com[MrDocs]#
