[#BloombergLP-bsls-SystemClockType-Enum]
= xref:BloombergLP.adoc[BloombergLP]::xref:BloombergLP/bsls.adoc[bsls]::xref:BloombergLP/bsls/SystemClockType.adoc[SystemClockType]::Enum
:relfileprefix: ../../../
:mrdocs:

System clock type enumerators&period;

== Synopsis

Declared in `&lt;bsls&lowbar;systemclocktype&period;h&gt;`

[source,cpp,subs="verbatim,replacements,macros,-callouts"]
----
enum Enum;
----

== Members

[cols="1,4"]
|===
| Name| Description
| `e&lowbar;REALTIME` 
| Wall&hyphen;clock time that may jump when the system clock is adjusted&period;
| `e&lowbar;MONOTONIC` 
| Monotonic clock measuring elapsed time from an unspecified epoch&period;
|===



[.small]#Created with https://www.mrdocs.com[MrDocs]#
