[#BloombergLP-bsls-Stopwatch-k_COLLECT_WALL_TIME_ONLY]
= xref:BloombergLP.adoc[BloombergLP]::xref:BloombergLP/bsls.adoc[bsls]::xref:BloombergLP/bsls/Stopwatch.adoc[Stopwatch]::k&lowbar;COLLECT&lowbar;WALL&lowbar;TIME&lowbar;ONLY
:relfileprefix: ../../../
:mrdocs:

Collect wall time only (not CPU time)&period;

== Synopsis

Declared in `&lt;bsls&lowbar;stopwatch&period;h&gt;`

[source,cpp,subs="verbatim,replacements,macros,-callouts"]
----
static
bool const k&lowbar;COLLECT&lowbar;WALL&lowbar;TIME&lowbar;ONLY = false;
----


[.small]#Created with https://www.mrdocs.com[MrDocs]#
