[#BloombergLP-bsls-Stopwatch-k_COLLECT_WALL_AND_CPU_TIMES]
= xref:BloombergLP.adoc[BloombergLP]::xref:BloombergLP/bsls.adoc[bsls]::xref:BloombergLP/bsls/Stopwatch.adoc[Stopwatch]::k&lowbar;COLLECT&lowbar;WALL&lowbar;AND&lowbar;CPU&lowbar;TIMES
:relfileprefix: ../../../
:mrdocs:

For readability&sol;ease of understanding of code that calls the `start(bool)` method use these constants as arguments&period;

== Synopsis

Declared in `&lt;bsls&lowbar;stopwatch&period;h&gt;`

[source,cpp,subs="verbatim,replacements,macros,-callouts"]
----
static
bool const k&lowbar;COLLECT&lowbar;WALL&lowbar;AND&lowbar;CPU&lowbar;TIMES = true;
----


[.small]#Created with https://www.mrdocs.com[MrDocs]#
