[#BloombergLP-bsls-AlignedBuffer_Data]
= xref:BloombergLP.adoc[BloombergLP]::xref:BloombergLP/bsls.adoc[bsls]::AlignedBuffer&lowbar;Data
:relfileprefix: ../../
:mrdocs:

Private char array of specified `SIZE` aligned to `ALIGNMENT`&period;

== Synopsis

Declared in `&lt;bsls&lowbar;alignedbuffer&period;h&gt;`

[source,cpp,subs="verbatim,replacements,macros,-callouts"]
----
template&lt;
    int SIZE,
    int ALIGNMENT&gt;
union AlignedBuffer&lowbar;Data;
----

== Description

This _private_ implementation type provides a public `char` array data member `d&lowbar;buffer` whose length is the specifed (template parameter) `SIZE` and which is aligned according to the specified (template parameter) `ALIGNMENT`&period;

== Type Aliases

[cols="1,4"]
|===
| Name| Description
| xref:BloombergLP/bsls/AlignedBuffer_Data/AlignmentType.adoc[`AlignmentType`] 
| Alias for the alignment type used by this union&period;
|===


== Data Members

[cols="1,4"]
|===
| Name| Description
| xref:BloombergLP/bsls/AlignedBuffer_Data/d_buffer.adoc[`d&lowbar;buffer`] [.small]#[variant member]#
| Raw byte buffer of length `SIZE` aligned to `ALIGNMENT` bytes&period;
|===



[.small]#Created with https://www.mrdocs.com[MrDocs]#
