[#BloombergLP-bslmt-ThreadAttributes-2constructor-0e]
= xref:BloombergLP.adoc[BloombergLP]::xref:BloombergLP/bslmt.adoc[bslmt]::xref:BloombergLP/bslmt/ThreadAttributes.adoc[ThreadAttributes]::ThreadAttributes
:relfileprefix: ../../../
:mrdocs:

Same as the default constructor, using the specified `basicAllocator`&period;

== Synopsis

Declared in `&lt;bslmt&lowbar;threadattributes&period;h&gt;`

[source,cpp,subs="verbatim,replacements,macros,-callouts"]
----
explicit
ThreadAttributes(xref:BloombergLP/bslma/Allocator.adoc[bslma::Allocator]* basicAllocator);
----

== Description

If `basicAllocator` is 0, the currently installed default allocator is used&period;

== Parameters

[cols="1,4"]
|===
| Name| Description
| *basicAllocator*
| memory allocator&semi; null uses the default
|===


[.small]#Created with https://www.mrdocs.com[MrDocs]#
