[#BloombergLP-bslmt-ReadLockGuardTryLock-ptr]
= xref:BloombergLP.adoc[BloombergLP]::xref:BloombergLP/bslmt.adoc[bslmt]::xref:BloombergLP/bslmt/ReadLockGuardTryLock.adoc[ReadLockGuardTryLock]::ptr
:relfileprefix: ../../../
:mrdocs:

Return the address of the modifiable lock object under management by this guard, or 0 if no lock is currently being managed&period;

== Synopsis

Declared in `&lt;bslmt&lowbar;readlockguard&period;h&gt;`

[source,cpp,subs="verbatim,replacements,macros,-callouts"]
----
T*
ptr() const;
----

== Return Value

address of the managed lock, or 0 if none


[.small]#Created with https://www.mrdocs.com[MrDocs]#
