[#BloombergLP-bslmt-FastPostSemaphoreImpl-getValueRaw]
= xref:BloombergLP.adoc[BloombergLP]::xref:BloombergLP/bslmt.adoc[bslmt]::xref:BloombergLP/bslmt/FastPostSemaphoreImpl.adoc[FastPostSemaphoreImpl]::getValueRaw
:relfileprefix: ../../../
:mrdocs:

Return the current value (`count`) of this semaphore&period;

== Synopsis

Declared in `&lt;bslmt&lowbar;fastpostsemaphoreimpl&period;h&gt;`

[source,cpp,subs="verbatim,replacements,macros,-callouts"]
----
int
getValueRaw() const;
----

== Description

Note that, unlike `getValue`, this method can return a negative value&period; Also note that this method is principally intended for use in testing&period;

== Return Value

current value (`count`) of this semaphore


[.small]#Created with https://www.mrdocs.com[MrDocs]#
