[#BloombergLP-bslmt-ChronoUtil]
= xref:BloombergLP.adoc[BloombergLP]::xref:BloombergLP/bslmt.adoc[bslmt]::ChronoUtil
:relfileprefix: ../../
:mrdocs:

This `struct` provides a namespace for utility functions that operate on `bsl&colon;&colon;chrono` facilities&period;

== Synopsis

Declared in `&lt;bslmt&lowbar;chronoutil&period;h&gt;`

[source,cpp,subs="verbatim,replacements,macros,-callouts"]
----
struct ChronoUtil;
----

== Member Functions

[cols="1,4"]
|===
| Name| Description
| xref:BloombergLP/bslmt/ChronoUtil/isMatchingClock-04.adoc[`isMatchingClock`] 
| `isMatchingClock` overloads
|===


== Static Member Functions

[cols="1,4"]
|===
| Name| Description
| xref:BloombergLP/bslmt/ChronoUtil/durationToTimeInterval.adoc[`durationToTimeInterval`] 
| Convert a chrono duration to a `bsls&colon;&colon;TimeInterval`&period;
| xref:BloombergLP/bslmt/ChronoUtil/isMatchingClock-01.adoc[`isMatchingClock`] 
| Return whether `CLOCK` matches the specified `clockType`&period;
| xref:BloombergLP/bslmt/ChronoUtil/timedWait-0b.adoc[`timedWait`] 
| `timedWait` overloads
|===



[.small]#Created with https://www.mrdocs.com[MrDocs]#
