[#BloombergLP-bslmf-VoidType-type]
= xref:BloombergLP.adoc[BloombergLP]::xref:BloombergLP/bslmf.adoc[bslmf]::xref:BloombergLP/bslmf/VoidType.adoc[VoidType]::type
:relfileprefix: ../../../
:mrdocs:

Always `void`&period;

== Synopsis

Declared in `&lt;bslmf&lowbar;voidtype&period;h&gt;`

[source,cpp,subs="verbatim,replacements,macros,-callouts"]
----
typedef void type;
----


[.small]#Created with https://www.mrdocs.com[MrDocs]#
