[#BloombergLP-bslma-IsStdAllocator-06f]
= xref:BloombergLP.adoc[BloombergLP]::xref:BloombergLP/bslma.adoc[bslma]::xref:BloombergLP/bslma/IsStdAllocator-07.adoc[IsStdAllocator]&lt;xref:bsl/allocator-0a.adoc[bsl::allocator&lt;void&gt;]&gt;
:relfileprefix: ../../
:mrdocs:

`bsl&colon;&colon;allocator&lt;void&gt;` is not an allocator type, even though all other instantiations are allocator types&period;

== Synopsis

Declared in `&lt;bslma&lowbar;bslallocator&period;h&gt;`

[source,cpp,subs="verbatim,replacements,macros,-callouts"]
----
template&lt;&gt;
struct xref:BloombergLP/bslma/IsStdAllocator-07.adoc[IsStdAllocator]&lt;xref:bsl/allocator-0a.adoc[bsl::allocator&lt;void&gt;]&gt;
    : xref:bsl/false_type.adoc[bsl::false&lowbar;type]
----

== Base Classes

[cols="1,4"]
|===
| Name| Description
| `xref:bsl/false_type.adoc[bsl::false&lowbar;type]`
| Metafunction representing the boolean constant `false`&period;
|===


[.small]#Created with https://www.mrdocs.com[MrDocs]#
