[#BloombergLP-bslma-Allocator-is_equal]
= xref:BloombergLP.adoc[BloombergLP]::xref:BloombergLP/bslma.adoc[bslma]::xref:BloombergLP/bslma/Allocator.adoc[Allocator]::is&lowbar;equal
:relfileprefix: ../../../
:mrdocs:

== Synopsis

Declared in `&lt;bslma&lowbar;allocator&period;h&gt;`

[source,cpp,subs="verbatim,replacements,macros,-callouts"]
----
&lsqb;&lsqb;nodiscard&rsqb;&rsqb;
bool
is&lowbar;equal(memory&lowbar;resource const& &lowbar;&lowbar;other) const noexcept;
----

== Return Value

[NOTE]
====
The return value https://en.cppreference.com/cpp/language/attributes/nodiscard[should not be discarded^].
====

[.small]#Created with https://www.mrdocs.com[MrDocs]#
