[#BloombergLP-bslfmt-FormatterBase_IsStdChronoUtcTime-0a7-value]
= xref:BloombergLP.adoc[BloombergLP]::xref:BloombergLP/bslfmt.adoc[bslfmt]::xref:BloombergLP/bslfmt/FormatterBase_IsStdChronoUtcTime-0a7.adoc[FormatterBase&lowbar;IsStdChronoUtcTime]::value
:relfileprefix: ../../../
:mrdocs:

== Synopsis

Declared in `&lt;bslfmt&lowbar;formatterbase&period;h&gt;`

[source,cpp,subs="verbatim,replacements,macros,-callouts"]
----
static
bool const value = false;
----


[.small]#Created with https://www.mrdocs.com[MrDocs]#
