[#BloombergLP-bdlmt-TimerEventScheduler-nextPendingEventTime]
= xref:BloombergLP.adoc[BloombergLP]::xref:BloombergLP/bdlmt.adoc[bdlmt]::xref:BloombergLP/bdlmt/TimerEventScheduler.adoc[TimerEventScheduler]::nextPendingEventTime
:relfileprefix: ../../../
:mrdocs:

Return the earliest scheduled time among pending events and clocks&period;

== Synopsis

Declared in `&lt;bdlmt&lowbar;timereventscheduler&period;h&gt;`

[source,cpp,subs="verbatim,replacements,macros,-callouts"]
----
xref:BloombergLP/bsls/TimeInterval.adoc[bsls::TimeInterval]
nextPendingEventTime() const;
----

== Description

Return the earliest scheduled starting time of the pending events and clocks registered with this scheduler&period; If there are no pending events or clocks, return `INT64&lowbar;MAX` microseconds&period;

== Return Value

the earliest scheduled starting time, or `INT64&lowbar;MAX` microseconds if none


[.small]#Created with https://www.mrdocs.com[MrDocs]#
