[#BloombergLP-bdlmt-TimerEventScheduler-clockType]
= xref:BloombergLP.adoc[BloombergLP]::xref:BloombergLP/bdlmt.adoc[bdlmt]::xref:BloombergLP/bdlmt/TimerEventScheduler.adoc[TimerEventScheduler]::clockType
:relfileprefix: ../../../
:mrdocs:

Return the value of the clock type that this object was created with&period;

== Synopsis

Declared in `&lt;bdlmt&lowbar;timereventscheduler&period;h&gt;`

[source,cpp,subs="verbatim,replacements,macros,-callouts"]
----
xref:BloombergLP/bsls/SystemClockType/Enum.adoc[bsls::SystemClockType::Enum]
clockType() const;
----

== Return Value

the clock type with which this object was created


[.small]#Created with https://www.mrdocs.com[MrDocs]#
