[#BloombergLP-bdlmt-Signaler_SlotNode-notifyDisconnected]
= xref:BloombergLP.adoc[BloombergLP]::xref:BloombergLP/bdlmt.adoc[bdlmt]::xref:BloombergLP/bdlmt/Signaler_SlotNode.adoc[Signaler&lowbar;SlotNode]::notifyDisconnected
:relfileprefix: ../../../
:mrdocs:

Notify this slot that is was disconnected from its associated signaler&period; Throws nothing&period; After this function completes, `isConnected()` returns `false`&period;

== Synopsis

Declared in `&lt;bdlmt&lowbar;signaler&period;h&gt;`

[source,cpp,subs="verbatim,replacements,macros,-callouts"]
----
void
notifyDisconnected() noexcept;
----


[.small]#Created with https://www.mrdocs.com[MrDocs]#
