[#BloombergLP-bdlmt-Signaler_Node-disconnectAllSlots]
= xref:BloombergLP.adoc[BloombergLP]::xref:BloombergLP/bdlmt.adoc[bdlmt]::xref:BloombergLP/bdlmt/Signaler_Node.adoc[Signaler&lowbar;Node]::disconnectAllSlots
:relfileprefix: ../../../
:mrdocs:

Disconnect all slots connected to this signaler without waiting&period;

== Synopsis

Declared in `&lt;bdlmt&lowbar;signaler&period;h&gt;`

[source,cpp,subs="verbatim,replacements,macros,-callouts"]
----
void
disconnectAllSlots() noexcept;
----

== Description

Implements `Signaler&colon;&colon;disconnectAllSlots()`&period; Disconnect all slots, if any, connected to this signaler&period; Any signals emitted on the corresponding signaler that happen after this call to disconnect completes will not call any slots that were connected prior to this call&period; Throws nothing&period; Note that this function does not block the calling thread pending completion of ongoing signals emitted on the signaler&period; Also note that it is unspecified how many slots, if any, will be called by any invocation on the signaler that begins before this function completes&period; Also note that if a slot is connected to this signaler during a call to this function, it is unspecified whether that slot will be disconnected&period;


[.small]#Created with https://www.mrdocs.com[MrDocs]#
