[#BloombergLP-bdlma-BufferedSequentialPool-d_pool_p]
= xref:BloombergLP.adoc[BloombergLP]::xref:BloombergLP/bdlma.adoc[bdlma]::xref:BloombergLP/bdlma/BufferedSequentialPool.adoc[BufferedSequentialPool]::d&lowbar;pool&lowbar;p
:relfileprefix: ../../../
:mrdocs:

Sequential pool used once the external buffer is exhausted&period;

== Synopsis

Declared in `&lt;bdlma&lowbar;bufferedsequentialpool&period;h&gt;`

[source,cpp,subs="verbatim,replacements,macros,-callouts"]
----
xref:BloombergLP/bdlma/SequentialPool.adoc[SequentialPool]* d&lowbar;pool&lowbar;p;
----


[.small]#Created with https://www.mrdocs.com[MrDocs]#
