[#BloombergLP-bdlma-BufferManager-reset]
= xref:BloombergLP.adoc[BloombergLP]::xref:BloombergLP/bdlma.adoc[bdlma]::xref:BloombergLP/bdlma/BufferManager.adoc[BufferManager]::reset
:relfileprefix: ../../../
:mrdocs:

Reset this buffer manager to its default&hyphen;constructed state&period;

== Synopsis

Declared in `&lt;bdlma&lowbar;buffermanager&period;h&gt;`

[source,cpp,subs="verbatim,replacements,macros,-callouts"]
----
void
reset();
----

== Description

Reset this buffer manager to its default constructed state, except retain the alignment strategy in effect at the time of construction&period; The currently managed buffer (if any) is removed from the management of this object with no effect on the outstanding allocated memory blocks&period;


[.small]#Created with https://www.mrdocs.com[MrDocs]#
