[#BloombergLP-bdldfp-DecimalImpUtil_IntelDfp-_04enum]
= xref:BloombergLP.adoc[BloombergLP]::xref:BloombergLP/bdldfp.adoc[bdldfp]::xref:BloombergLP/bdldfp/DecimalImpUtil_IntelDfp.adoc[DecimalImpUtil&lowbar;IntelDfp]::Unnamed enum
:relfileprefix: ../../../
:mrdocs:

Status flags for decimal numeric operations&period;

== Synopsis

Declared in `&lt;bdldfp&lowbar;decimalimputil&lowbar;inteldfp&period;h&gt;`

[source,cpp,subs="verbatim,replacements,macros,-callouts"]
----
enum Unnamed enum;
----

== Members

[cols="1,4"]
|===
| Name| Description
| `k&lowbar;STATUS&lowbar;INEXACT` 
| Inexact&hyphen;result status flag for decimal operations&period;
| `k&lowbar;STATUS&lowbar;UNDERFLOW` 
| Overflow status flag for decimal operations&period;
| `k&lowbar;STATUS&lowbar;OVERFLOW` 
| Overflow status flag for decimal operations&period;
|===



[.small]#Created with https://www.mrdocs.com[MrDocs]#
