[#BloombergLP-bdlde-QuotedPrintableDecoder-isMaximal]
= xref:BloombergLP.adoc[BloombergLP]::xref:BloombergLP/bdlde.adoc[bdlde]::xref:BloombergLP/bdlde/QuotedPrintableDecoder.adoc[QuotedPrintableDecoder]::isMaximal
:relfileprefix: ../../../
:mrdocs:

Return whether the input to this decoder is maximal&period;

== Synopsis

Declared in `&lt;bdlde&lowbar;quotedprintabledecoder&period;h&gt;`

[source,cpp,subs="verbatim,replacements,macros,-callouts"]
----
bool
isMaximal() const;
----

== Description

Return `true` if the input to this decoder is maximal (i&period;e&period;, the input contains an end&hyphen;of&hyphen;input sentinel, signaling that no further input should be expected)&period; _Always_ returns `false` for Quoted&hyphen;Printable decoders since the encoding scheme does not specify an end&hyphen;of&hyphen;input sentinel&period;

== Return Value

`true` if the input is maximal, and `false` otherwise (always `false` for Quoted&hyphen;Printable decoders)


[.small]#Created with https://www.mrdocs.com[MrDocs]#
