[#BloombergLP-bdlb-operator_ge-058]
= xref:BloombergLP.adoc[BloombergLP]::xref:BloombergLP/bdlb.adoc[bdlb]::operator&gt;&equals;
:relfileprefix: ../../
:mrdocs:

Return whether the specified `lhs` is ordered after or equal to `rhs`&period;

== Synopsis

Declared in `&lt;bdlb&lowbar;nullablevalue&period;h&gt;`

[source,cpp,subs="verbatim,replacements,macros,-callouts"]
----
template&lt;
    class LHS&lowbar;TYPE,
    class RHS&lowbar;TYPE&gt;
bool
operator&gt;&equals;(
    xref:BloombergLP/bdlb/NullableValue.adoc[NullableValue&lt;LHS&lowbar;TYPE&gt;] const& lhs,
    xref:BloombergLP/bdlb/NullableValue.adoc[NullableValue&lt;RHS&lowbar;TYPE&gt;] const& rhs)
requires requires &lcub;
        &lcub; &ast;lhs &gt;&equals; &ast;rhs &rcub; &hyphen;&gt; NullableValue&lowbar;ConvertibleToBool&semi;
    &rcub;;
----

== Description

Return `true` if the specified `lhs` nullable object is ordered after the specified `rhs` nullable object or `lhs` and `rhs` have the same value, and `false` otherwise&period; (See `operator&gt;` and `operator&equals;&equals;`&period;) Note that this operator returns `&ast;lhs &gt;&equals; &ast;rhs` when both operands are of `NullableValue` type and have a value&period; Also note that this function will fail to compile if `LHS&lowbar;TYPE` and `RHS&lowbar;TYPE` are not compatible&period;

== Return Value

`true` if `lhs` is ordered after `rhs` or they are equal, and `false` otherwise

== Parameters

[cols="1,4"]
|===
| Name| Description
| *lhs*
| left&hyphen;hand operand
| *rhs*
| right&hyphen;hand operand
|===


[.small]#Created with https://www.mrdocs.com[MrDocs]#
