[#BloombergLP-bdlar-k_TMP_ANY_BUFFER_SIZE]
= xref:BloombergLP.adoc[BloombergLP]::xref:BloombergLP/bdlar.adoc[bdlar]::k&lowbar;TMP&lowbar;ANY&lowbar;BUFFER&lowbar;SIZE
:relfileprefix: ../../
:mrdocs:

Minimum buffer size required to store one `AnyConstRef` object&period;

== Synopsis

Declared in `&lt;bdlar&lowbar;customizedtyperef&period;h&gt;`

[source,cpp,subs="verbatim,replacements,macros,-callouts"]
----
size&lowbar;t const k&lowbar;TMP&lowbar;ANY&lowbar;BUFFER&lowbar;SIZE = sizeof(void&ast;) &ast; 3;
----


[.small]#Created with https://www.mrdocs.com[MrDocs]#
