[#BloombergLP-bdlar-CustomizedTypeVtable-Reset]
= xref:BloombergLP.adoc[BloombergLP]::xref:BloombergLP/bdlar.adoc[bdlar]::xref:BloombergLP/bdlar/CustomizedTypeVtable.adoc[CustomizedTypeVtable]::Reset
:relfileprefix: ../../../
:mrdocs:

Function pointer type resetting a customized type to its default value&period;

== Synopsis

Declared in `&lt;bdlar&lowbar;customizedtypevtable&period;h&gt;`

[source,cpp,subs="verbatim,replacements,macros,-callouts"]
----
typedef void Reset(void*);
----


[.small]#Created with https://www.mrdocs.com[MrDocs]#
