[#BloombergLP-balst-StackTraceTestAllocator-failAbort]
= xref:BloombergLP.adoc[BloombergLP]::xref:BloombergLP/balst.adoc[balst]::xref:BloombergLP/balst/StackTraceTestAllocator.adoc[StackTraceTestAllocator]::failAbort
:relfileprefix: ../../../
:mrdocs:

Call `bsl&colon;&colon;abort()` to terminate the process on failure&period;

== Synopsis

Declared in `&lt;balst&lowbar;stacktracetestallocator&period;h&gt;`

[source,cpp,subs="verbatim,replacements,macros,-callouts"]
----
static
void
failAbort();
----

== Description

`d&lowbar;failureHandler` is initialized to this value by all constructors&period; Note that in ALL failure situations, errors or warnings will be written to the `ostream` associated with this object prior to the failure handler call&period;


[.small]#Created with https://www.mrdocs.com[MrDocs]#
