[#BloombergLP-balst-StackTraceFrame-allocator]
= xref:BloombergLP.adoc[BloombergLP]::xref:BloombergLP/balst.adoc[balst]::xref:BloombergLP/balst/StackTraceFrame.adoc[StackTraceFrame]::allocator
:relfileprefix: ../../../
:mrdocs:

Return the allocator used by this object to supply memory&period;

== Synopsis

Declared in `&lt;balst&lowbar;stacktraceframe&period;h&gt;`

[source,cpp,subs="verbatim,replacements,macros,-callouts"]
----
xref:BloombergLP/bslma/Allocator.adoc[bslma::Allocator]*
allocator() const;
----

== Description

Note that if no allocator was supplied at construction the currently installed default allocator is used&period;

== Return Value

the allocator used by this object to supply memory


[.small]#Created with https://www.mrdocs.com[MrDocs]#
