[#BloombergLP-balst-StackTraceConfigurationUtil-isResolutionDisabled]
= xref:BloombergLP.adoc[BloombergLP]::xref:BloombergLP/balst.adoc[balst]::xref:BloombergLP/balst/StackTraceConfigurationUtil.adoc[StackTraceConfigurationUtil]::isResolutionDisabled
:relfileprefix: ../../../
:mrdocs:

Return whether symbol and line number resolution in stack traces is disabled&period;

== Synopsis

Declared in `&lt;balst&lowbar;stacktraceconfigurationutil&period;h&gt;`

[source,cpp,subs="verbatim,replacements,macros,-callouts"]
----
static
bool
isResolutionDisabled();
----

== Description

Note that if neither `disableResolution` nor `enableResolution` have ever been called, this defaults to `false`&period;

== Return Value

`true` if resolution is disabled, and `false` otherwise


[.small]#Created with https://www.mrdocs.com[MrDocs]#
