[#BloombergLP-balst-StackTraceConfigurationUtil-enableResolution]
= xref:BloombergLP.adoc[BloombergLP]::xref:BloombergLP/balst.adoc[balst]::xref:BloombergLP/balst/StackTraceConfigurationUtil.adoc[StackTraceConfigurationUtil]::enableResolution
:relfileprefix: ../../../
:mrdocs:

Enable symbol, source file name, and line number resolution in stack traces performed by `balst`&period;

== Synopsis

Declared in `&lt;balst&lowbar;stacktraceconfigurationutil&period;h&gt;`

[source,cpp,subs="verbatim,replacements,macros,-callouts"]
----
static
void
enableResolution();
----

== Description

On platforms that support them, enable symbol resolution and source file name and line number resolution&period; Note that such resolution is expensive, involving disk access, and on Windows platforms has thread&hyphen;safety concerns if the application is using `dbghelp&period;dll`&period; Enabling resolution (the default state) results in `balst` stack traces giving as much information as is available on the platform&period;


[.small]#Created with https://www.mrdocs.com[MrDocs]#
