[#BloombergLP-balst-StackTraceConfigurationUtil-disableResolution]
= xref:BloombergLP.adoc[BloombergLP]::xref:BloombergLP/balst.adoc[balst]::xref:BloombergLP/balst/StackTraceConfigurationUtil.adoc[StackTraceConfigurationUtil]::disableResolution
:relfileprefix: ../../../
:mrdocs:

Disable symbol, source file name, and line number resolution in stack traces performed by `balst`&period;

== Synopsis

Declared in `&lt;balst&lowbar;stacktraceconfigurationutil&period;h&gt;`

[source,cpp,subs="verbatim,replacements,macros,-callouts"]
----
static
void
disableResolution();
----

== Description

Note that such resolution is expensive, involving disk access, and on Windows platforms has thread&hyphen;safety concerns if the application is using `dbghelp&period;dll`&period; Disabling resolution allows an application owner to globally prevent any resolution of symbols (by `balst`) in the process&period;


[.small]#Created with https://www.mrdocs.com[MrDocs]#
