[#BloombergLP-balm-StopwatchScopedGuard-Units]
= xref:BloombergLP.adoc[BloombergLP]::xref:BloombergLP/balm.adoc[balm]::xref:BloombergLP/balm/StopwatchScopedGuard.adoc[StopwatchScopedGuard]::Units
:relfileprefix: ../../../
:mrdocs:

Time units for reporting elapsed time&period;

== Synopsis

Declared in `&lt;balm&lowbar;stopwatchscopedguard&period;h&gt;`

[source,cpp,subs="verbatim,replacements,macros,-callouts"]
----
enum Units;
----

== Members

[cols="1,4"]
|===
| Name| Description
| `k&lowbar;NANOSECONDS` 
| Nanoseconds per second scale factor&period;
| `k&lowbar;MICROSECONDS` 
| Microseconds per second scale factor&period;
| `k&lowbar;MILLISECONDS` 
| Milliseconds per second scale factor&period;
| `k&lowbar;SECONDS` 
| Seconds scale factor&period;
| `BAEM&lowbar;NANOSECONDS` 
| Deprecated alias for `k&lowbar;NANOSECONDS`&period;
| `BAEM&lowbar;MICROSECONDS` 
| Deprecated alias for `k&lowbar;MICROSECONDS`&period;
| `BAEM&lowbar;MILLISECONDS` 
| Deprecated alias for `k&lowbar;MILLISECONDS`&period;
| `BAEM&lowbar;SECONDS` 
| Deprecated alias for `k&lowbar;SECONDS`&period;
| `NANOSECONDS` 
| Deprecated alias for `k&lowbar;NANOSECONDS`&period;
| `MICROSECONDS` 
| Deprecated alias for `k&lowbar;MICROSECONDS`&period;
| `MILLISECONDS` 
| Deprecated alias for `k&lowbar;MILLISECONDS`&period;
| `SECONDS` 
| Deprecated alias for `k&lowbar;SECONDS`&period;
|===



[.small]#Created with https://www.mrdocs.com[MrDocs]#
