[#BloombergLP-balm-PublicationType-Value]
= xref:BloombergLP.adoc[BloombergLP]::xref:BloombergLP/balm.adoc[balm]::xref:BloombergLP/balm/PublicationType.adoc[PublicationType]::Value
:relfileprefix: ../../../
:mrdocs:

Publication type enumerator values&period;

== Synopsis

Declared in `&lt;balm&lowbar;publicationtype&period;h&gt;`

[source,cpp,subs="verbatim,replacements,macros,-callouts"]
----
enum Value;
----

== Members

[cols="1,4"]
|===
| Name| Description
| `e&lowbar;UNSPECIFIED` 
| There is no defined publication type for the metric&period;
| `e&lowbar;TOTAL` 
| Total of measured values over the published interval&period;
| `e&lowbar;COUNT` 
| Count of updates over the published interval&period;
| `e&lowbar;MIN` 
| Minimum measured value over the published interval&period;
| `e&lowbar;MAX` 
| Maximum measured value over the published interval&period;
| `e&lowbar;AVG` 
| Average measured value over the published interval&period;
| `e&lowbar;RATE` 
| Total measured value per second over the published interval&period;
| `e&lowbar;RATE&lowbar;COUNT` 
| Count of measured events per second over the published interval&period;
| `BAEM&lowbar;UNSPECIFIED` 
| Deprecated alias for `e&lowbar;UNSPECIFIED`&period;
| `BAEM&lowbar;TOTAL` 
| Deprecated alias for `e&lowbar;TOTAL`&period;
| `BAEM&lowbar;COUNT` 
| Deprecated alias for `e&lowbar;COUNT`&period;
| `BAEM&lowbar;MIN` 
| Deprecated alias for `e&lowbar;MIN`&period;
| `BAEM&lowbar;MAX` 
| Deprecated alias for `e&lowbar;MAX`&period;
| `BAEM&lowbar;AVG` 
| Deprecated alias for `e&lowbar;AVG`&period;
| `BAEM&lowbar;RATE` 
| Deprecated alias for `e&lowbar;RATE`&period;
| `BAEM&lowbar;RATE&lowbar;COUNT` 
| Deprecated alias for `e&lowbar;RATE&lowbar;COUNT`&period;
|===



[.small]#Created with https://www.mrdocs.com[MrDocs]#
