[#BloombergLP-balm-MetricFormatSpec-2constructor-02]
= xref:BloombergLP.adoc[BloombergLP]::xref:BloombergLP/balm.adoc[balm]::xref:BloombergLP/balm/MetricFormatSpec.adoc[MetricFormatSpec]::MetricFormatSpec
:relfileprefix: ../../../
:mrdocs:

Create a metric format spec having default values for `scale` and `format`&period; The default value for `scale` is 1&period;0 and the default value for `format` is &quot;%f&quot;&period;

== Synopsis

Declared in `&lt;balm&lowbar;metricformat&period;h&gt;`

[source,cpp,subs="verbatim,replacements,macros,-callouts"]
----
MetricFormatSpec();
----


[.small]#Created with https://www.mrdocs.com[MrDocs]#
