[#BloombergLP-balm-MetricFormat-2constructor-0d6]
= xref:BloombergLP.adoc[BloombergLP]::xref:BloombergLP/balm.adoc[balm]::xref:BloombergLP/balm/MetricFormat.adoc[MetricFormat]::MetricFormat
:relfileprefix: ../../../
:mrdocs:

Constructors

== Synopses

Declared in `&lt;balm&lowbar;metricformat&period;h&gt;`

Create an empty metric format object&period;


[source,cpp,subs="verbatim,replacements,macros,-callouts"]
----
xref:BloombergLP/balm/MetricFormat/2constructor-0b.adoc[MetricFormat](xref:BloombergLP/bslma/Allocator.adoc[bslma::Allocator]* basicAllocator = 0);
----

[.small]#xref:BloombergLP/balm/MetricFormat/2constructor-0b.adoc[_» more&period;&period;&period;_]#

Create a metric format object having the same value as the specified `original` format&period;


[source,cpp,subs="verbatim,replacements,macros,-callouts"]
----
xref:BloombergLP/balm/MetricFormat/2constructor-0dd.adoc[MetricFormat](
    xref:BloombergLP/balm/MetricFormat.adoc[MetricFormat] const& original,
    xref:BloombergLP/bslma/Allocator.adoc[bslma::Allocator]* basicAllocator = 0);
----

[.small]#xref:BloombergLP/balm/MetricFormat/2constructor-0dd.adoc[_» more&period;&period;&period;_]#

== Parameters

[cols="1,4"]
|===
| Name| Description
| *basicAllocator*
| memory allocator&semi; null uses the default
| *original*
| format to copy
|===


[.small]#Created with https://www.mrdocs.com[MrDocs]#
