[#BloombergLP-balm-CategoryHolder-reset]
= xref:BloombergLP.adoc[BloombergLP]::xref:BloombergLP/balm.adoc[balm]::xref:BloombergLP/balm/CategoryHolder.adoc[CategoryHolder]::reset
:relfileprefix: ../../../
:mrdocs:

Reset this object to its default value&period; The default value is&colon; &grave; &lcub; false, 0, 0 &rcub; &grave;

== Synopsis

Declared in `&lt;balm&lowbar;category&period;h&gt;`

[source,cpp,subs="verbatim,replacements,macros,-callouts"]
----
void
reset();
----


[.small]#Created with https://www.mrdocs.com[MrDocs]#
