[#BloombergLP-ball-Transmission-Cause]
= xref:BloombergLP.adoc[BloombergLP]::xref:BloombergLP/ball.adoc[ball]::xref:BloombergLP/ball/Transmission.adoc[Transmission]::Cause
:relfileprefix: ../../../
:mrdocs:

Causes of the transmission of a log record&period;

== Synopsis

Declared in `&lt;ball&lowbar;transmission&period;h&gt;`

[source,cpp,subs="verbatim,replacements,macros,-callouts"]
----
enum Cause;
----

== Members

[cols="1,4"]
|===
| Name| Description
| `e&lowbar;PASSTHROUGH` 
| Single record emitted&semi; caused locally&period;
| `e&lowbar;TRIGGER` 
| All records emitted&semi; caused locally&period;
| `e&lowbar;TRIGGER&lowbar;ALL` 
| All records emitted&semi; caused remotely&period;
| `e&lowbar;MANUAL&lowbar;PUBLISH` 
| Manually publish a single record&period;
| `e&lowbar;MANUAL&lowbar;PUBLISH&lowbar;ALL` 
| Manually publish all records&period;
| `e&lowbar;END` 
| Not supported&semi; do not use&period;
|===



[.small]#Created with https://www.mrdocs.com[MrDocs]#
