[#BloombergLP-ball-ThresholdDefaults-k_TRIGGER_LEVEL]
= xref:BloombergLP.adoc[BloombergLP]::xref:BloombergLP/ball.adoc[ball]::xref:BloombergLP/ball/ThresholdDefaults.adoc[ThresholdDefaults]::k&lowbar;TRIGGER&lowbar;LEVEL
:relfileprefix: ../../../
:mrdocs:

Default trigger threshold level (disabled)&period;

== Synopsis

Declared in `&lt;ball&lowbar;thresholddefaults&period;h&gt;`

[source,cpp,subs="verbatim,replacements,macros,-callouts"]
----
static
int const k&lowbar;TRIGGER&lowbar;LEVEL = Severity&colon;&colon;e&lowbar;OFF;
----


[.small]#Created with https://www.mrdocs.com[MrDocs]#
