[#BloombergLP-ball-LoggerManagerDefaults-defaultRecordBufferSize]
= xref:BloombergLP.adoc[BloombergLP]::xref:BloombergLP/ball.adoc[ball]::xref:BloombergLP/ball/LoggerManagerDefaults.adoc[LoggerManagerDefaults]::defaultRecordBufferSize
:relfileprefix: ../../../
:mrdocs:

Return the default&hyphen;logger record&hyphen;buffer size attribute of this object&period;

== Synopsis

Declared in `&lt;ball&lowbar;loggermanagerdefaults&period;h&gt;`

[source,cpp,subs="verbatim,replacements,macros,-callouts"]
----
int
defaultRecordBufferSize() const;
----

== Return Value

default&hyphen;logger record&hyphen;buffer size attribute of this object


[.small]#Created with https://www.mrdocs.com[MrDocs]#
