[#BloombergLP-ball-LoggerManagerDefaults-defaultDefaultLoggerBufferSize]
= xref:BloombergLP.adoc[BloombergLP]::xref:BloombergLP/ball.adoc[ball]::xref:BloombergLP/ball/LoggerManagerDefaults.adoc[LoggerManagerDefaults]::defaultDefaultLoggerBufferSize
:relfileprefix: ../../../
:mrdocs:

Return the implementation&hyphen;defined default logger&hyphen;message&hyphen;buffer size value for this class&period;

== Synopsis

Declared in `&lt;ball&lowbar;loggermanagerdefaults&period;h&gt;`

[source,cpp,subs="verbatim,replacements,macros,-callouts"]
----
static
int
defaultDefaultLoggerBufferSize();
----

== Return Value

implementation&hyphen;defined default logger&hyphen;message&hyphen;buffer size value


[.small]#Created with https://www.mrdocs.com[MrDocs]#
