[#BloombergLP-ball-LoggerManagerConfiguration-isValidDefaultLoggerBufferSize]
= xref:BloombergLP.adoc[BloombergLP]::xref:BloombergLP/ball.adoc[ball]::xref:BloombergLP/ball/LoggerManagerConfiguration.adoc[LoggerManagerConfiguration]::isValidDefaultLoggerBufferSize
:relfileprefix: ../../../
:mrdocs:

Return whether `numBytes` is a valid default logger&hyphen;buffer size&period;

== Synopsis

Declared in `&lt;ball&lowbar;loggermanagerconfiguration&period;h&gt;`

[source,cpp,subs="verbatim,replacements,macros,-callouts"]
----
static
bool
isValidDefaultLoggerBufferSize(int numBytes);
----

== Description

`numBytes` is valid if `0 &lt; numBytes`&period;

== Return Value

`true` if `0 &lt; numBytes`, and `false` otherwise

== Parameters

[cols="1,4"]
|===
| Name| Description
| *numBytes*
| candidate default logger&hyphen;message&hyphen;buffer size
|===


[.small]#Created with https://www.mrdocs.com[MrDocs]#
