[#BloombergLP-ball-LoggerManagerConfiguration-defaultThresholdLevelsCallback-0f]
= xref:BloombergLP.adoc[BloombergLP]::xref:BloombergLP/ball.adoc[ball]::xref:BloombergLP/ball/LoggerManagerConfiguration.adoc[LoggerManagerConfiguration]::defaultThresholdLevelsCallback
:relfileprefix: ../../../
:mrdocs:

Return a reference to the non&hyphen;modifiable default severity&hyphen;level thresholds functor attribute of this object&period;

== Synopsis

Declared in `&lt;ball&lowbar;loggermanagerconfiguration&period;h&gt;`

[source,cpp,subs="verbatim,replacements,macros,-callouts"]
----
xref:BloombergLP/ball/LoggerManagerConfiguration/DefaultThresholdLevelsCallback-05.adoc[DefaultThresholdLevelsCallback] const&
defaultThresholdLevelsCallback() const;
----

== Return Value

reference to the non&hyphen;modifiable default severity&hyphen;level thresholds functor attribute


[.small]#Created with https://www.mrdocs.com[MrDocs]#
