[#BloombergLP-ball-LoggerManagerConfiguration-DefaultThresholdLevelsCallback-05]
= xref:BloombergLP.adoc[BloombergLP]::xref:BloombergLP/ball.adoc[ball]::xref:BloombergLP/ball/LoggerManagerConfiguration.adoc[LoggerManagerConfiguration]::DefaultThresholdLevelsCallback
:relfileprefix: ../../../
:mrdocs:

Functor type that supplies default threshold levels for categories&period;

== Synopsis

Declared in `&lt;ball&lowbar;loggermanagerconfiguration&period;h&gt;`

[source,cpp,subs="verbatim,replacements,macros,-callouts"]
----
typedef xref:BloombergLP/ball/CategoryCallbacks/DefaultThresholdLevels.adoc[CategoryCallbacks::DefaultThresholdLevels] DefaultThresholdLevelsCallback;
----

== Description

`DefaultThresholdLevelsCallback` is the type of the functor that determines default threshold levels for categories added to the registry by the `setCategory(const char &ast;)` method&period;


[.small]#Created with https://www.mrdocs.com[MrDocs]#
