[#BloombergLP-ball-LoggerManager-setCategoryThresholdsToFactoryDefaults]
= xref:BloombergLP.adoc[BloombergLP]::xref:BloombergLP/ball.adoc[ball]::xref:BloombergLP/ball/LoggerManager.adoc[LoggerManager]::setCategoryThresholdsToFactoryDefaults
:relfileprefix: ../../../
:mrdocs:

Set `category` thresholds to the factory default values&period;

== Synopsis

Declared in `&lt;ball&lowbar;loggermanager&period;h&gt;`

[source,cpp,subs="verbatim,replacements,macros,-callouts"]
----
void
setCategoryThresholdsToFactoryDefaults(xref:BloombergLP/ball/Category.adoc[Category]* category);
----

== Description

Set the threshold levels of the specified `category` in the category registry of this logger manager to the original &quot;factory&hyphen;supplied&quot; default values or the factory overrides supplied at construction&period; The behavior is undefined unless `category` is non&hyphen;null&period;

== Parameters

[cols="1,4"]
|===
| Name| Description
| *category*
| category whose thresholds are set
|===


[.small]#Created with https://www.mrdocs.com[MrDocs]#
