[#BloombergLP-ball-LoggerManager-defaultTriggerAllThresholdLevel]
= xref:BloombergLP.adoc[BloombergLP]::xref:BloombergLP/ball.adoc[ball]::xref:BloombergLP/ball/LoggerManager.adoc[LoggerManager]::defaultTriggerAllThresholdLevel
:relfileprefix: ../../../
:mrdocs:

Return the default trigger&hyphen;all threshold level of this logger manager&period;

== Synopsis

Declared in `&lt;ball&lowbar;loggermanager&period;h&gt;`

[source,cpp,subs="verbatim,replacements,macros,-callouts"]
----
int
defaultTriggerAllThresholdLevel() const;
----

== Return Value

default trigger&hyphen;all threshold level of this logger manager


[.small]#Created with https://www.mrdocs.com[MrDocs]#
