[#BloombergLP-ball-LoggerManager-defaultThresholdLevels]
= xref:BloombergLP.adoc[BloombergLP]::xref:BloombergLP/ball.adoc[ball]::xref:BloombergLP/ball/LoggerManager.adoc[LoggerManager]::defaultThresholdLevels
:relfileprefix: ../../../
:mrdocs:

Return the default threshold levels associated with this logger manager object&period;

== Synopsis

Declared in `&lt;ball&lowbar;loggermanager&period;h&gt;`

[source,cpp,subs="verbatim,replacements,macros,-callouts"]
----
xref:BloombergLP/ball/ThresholdAggregate.adoc[ThresholdAggregate]
defaultThresholdLevels() const;
----

== Return Value

default threshold levels associated with this logger manager


[.small]#Created with https://www.mrdocs.com[MrDocs]#
