[#BloombergLP-ball-FileObserver-setStdoutThreshold]
= xref:BloombergLP.adoc[BloombergLP]::xref:BloombergLP/ball.adoc[ball]::xref:BloombergLP/ball/FileObserver.adoc[FileObserver]::setStdoutThreshold
:relfileprefix: ../../../
:mrdocs:

Set the minimum severity of records logged to `stdout`&period;

== Synopsis

Declared in `&lt;ball&lowbar;fileobserver&period;h&gt;`

[source,cpp,subs="verbatim,replacements,macros,-callouts"]
----
void
setStdoutThreshold(xref:BloombergLP/ball/Severity/Level.adoc[Severity::Level] stdoutThreshold);
----

== Description

Set the minimum severity of records logged to `stdout` by this file observer to the specified `stdoutThreshold` level&period; Note that if the value of `stdoutThreshold` is `Severity&colon;&colon;e&lowbar;OFF`, logging to `stdout` is disabled&period;

== Parameters

[cols="1,4"]
|===
| Name| Description
| *stdoutThreshold*
| minimum severity for records logged to `stdout`
|===


[.small]#Created with https://www.mrdocs.com[MrDocs]#
