[#BloombergLP-ball-CategoryManager-resetDefaultThresholdLevels]
= xref:BloombergLP.adoc[BloombergLP]::xref:BloombergLP/ball.adoc[ball]::xref:BloombergLP/ball/CategoryManager.adoc[CategoryManager]::resetDefaultThresholdLevels
:relfileprefix: ../../../
:mrdocs:

Reset the default threshold levels to the original &quot;factory&hyphen;supplied&quot; default values or the factory overrides supplied at construction&period;

== Synopsis

Declared in `&lt;ball&lowbar;categorymanager&period;h&gt;`

[source,cpp,subs="verbatim,replacements,macros,-callouts"]
----
void
resetDefaultThresholdLevels();
----


[.small]#Created with https://www.mrdocs.com[MrDocs]#
