[#BloombergLP-ball-CategoryHolder-reset]
= xref:BloombergLP.adoc[BloombergLP]::xref:BloombergLP/ball.adoc[ball]::xref:BloombergLP/ball/CategoryHolder.adoc[CategoryHolder]::reset
:relfileprefix: ../../../
:mrdocs:

Reset this object to its default value&period; The default value is&colon; &grave; &lcub; e&lowbar;UNINITIALIZED&lowbar;CATEGORY, 0, 0 &rcub; &grave;

== Synopsis

Declared in `&lt;ball&lowbar;category&period;h&gt;`

[source,cpp,subs="verbatim,replacements,macros,-callouts"]
----
void
reset();
----


[.small]#Created with https://www.mrdocs.com[MrDocs]#
