[#BloombergLP-balber-BerEncoderOptions-setPreserveSignOfNegativeZero]
= xref:BloombergLP.adoc[BloombergLP]::xref:BloombergLP/balber.adoc[balber]::xref:BloombergLP/balber/BerEncoderOptions.adoc[BerEncoderOptions]::setPreserveSignOfNegativeZero
:relfileprefix: ../../../
:mrdocs:

Set the &quot;PreserveSignOfNegativeZero&quot; attribute of this object to the specified `value`&period;

== Synopsis

Declared in `&lt;balber&lowbar;berencoderoptions&period;h&gt;`

[source,cpp,subs="verbatim,replacements,macros,-callouts"]
----
void
setPreserveSignOfNegativeZero(bool value);
----

== Parameters

[cols="1,4"]
|===
| Name| Description
| *value*
| new value for the &quot;PreserveSignOfNegativeZero&quot; attribute
|===


[.small]#Created with https://www.mrdocs.com[MrDocs]#
