[#BloombergLP-balber-BerEncoderOptions-DEFAULT_INITIALIZER_BDE_VERSION_CONFORMANCE]
= xref:BloombergLP.adoc[BloombergLP]::xref:BloombergLP/balber.adoc[balber]::xref:BloombergLP/balber/BerEncoderOptions.adoc[BerEncoderOptions]::DEFAULT&lowbar;INITIALIZER&lowbar;BDE&lowbar;VERSION&lowbar;CONFORMANCE
:relfileprefix: ../../../
:mrdocs:

Default initial value for `bdeVersionConformance`&period;

== Synopsis

Declared in `&lt;balber&lowbar;berencoderoptions&period;h&gt;`

[source,cpp,subs="verbatim,replacements,macros,-callouts"]
----
static
int const DEFAULT&lowbar;INITIALIZER&lowbar;BDE&lowbar;VERSION&lowbar;CONFORMANCE;
----


[.small]#Created with https://www.mrdocs.com[MrDocs]#
